France
Ultralight
920
701
101
889.147
0
0
0
0
7.78484
20000
1
0
0
0.0118504
0.25237
-2.37009
-100.948
874.55
198.827
53.4462
0
1
Ultralight
1
874.727
195.92
64.149
-0.0153101
-0.0480125
-0.00065785
0
0
0
0
6
gull
gull
gull
gull
gull
gull
